SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

CREATE DATABASE IF NOT EXISTS `orion-ops-pro` DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci;
USE `orion-ops-pro`;

SET FOREIGN_KEY_CHECKS = 1;
